79 79.5 80 80.5 81 81.5

5 7 LEP,SLD Indirect Prediction

UA2 (1992)* D0 combined CDF combined

Hadron Collider Avg

LEP2 (161)* LEP2 (172)

LEP2 Avg

World Avg

M_W = 80.366 ± 0.371 M_W = 80.440 ± 0.110 M_W = 80.375 ± 0.120

M_W = 80.410 ± 0.090

M_W = 80.400 ± 0.220 M_W = 80.370 ± 0.190

M_W = 80.380 ± 0.140

M_W = 80.400 ± 0.080

M_W (GeV/c^2)