CAL+TKS R-Z VIEW  6-AUG-1996 17:30 Run   58766 Event   10750      9-JAN-1993 10:46

1.<E< 2. 2.<E< 3. 3.<E< 4. 4.<E< 5. 5.<E

 Max ET=   63.6 GeV
 CAEH ET SUM= 191.7 GeV
 VTX in Z= -12.5 (cm)