1/ΔηΙd^2σ/(dE_Tdη) fb/GeV

CTEQ3M μ=E_{T(max)}/2

Unsmeared Data

Jet E_T (GeV)

Sys. Error (%)

10^{-1} 1 10 10^2

10^3

10^4

10^5

10^6

10^7

-50Ψ 0Ψ 50Ψ

50 100 150 200 250 300 350 400 450 500