MW - PT (W ) spectrum and pdf’s

⋆ CDF W -Asymmetry data constrains pdf’s

→ Allow W -Asymmetry to vary by ±1σ

Obtain new parameterizations in which pdf & input spectrum - constrained by data - were varied simultaneously →

error due to theory

(P_T (W ) spectrum and pdfs): σ(M_W ) = 65 MeV