-10 -5 0 5 10 15 20 25 30

20 40 60 80 100 120 140 160 180 200 220 240 0

20

40

60

80

100

120 Ped CMN Sub Adc - Barrel 3, Ladder 1, Wafer 7, Hybrid 2