GEM, kV Δ 0.2 0.25 0.3 0.35 0.4 0.45 0.5 γN

510

610

T=293K 2 Neon+0.1% & 0.01% H Dashed Line APD Full Line PMT 0.1% 2H 0.01% 2H 45 60 100

150

=0.745 0.1 =0.7447, Qapd

0.01

Qapd =0.04258 0.1 =0.03658, Qpmt

0.01

Qpmt =0.66

phys ∈ =0.0091, g∈

GEM, kV Δ 0.16 0.18 0.2 0.22 0.24 0.26 0.28 0.3 0.32 0.34 γN

510

610

T=293K 2 Neon+1.0% H Dashed Line APD Full Line PMT

45 60

100 150

=0.00558 1.0 =0.7392, Qpmt 1.0 Qapd =0.66

phys ∈ =0.0091, g∈