Pressure,psi

20 40 60 80 100 120 140 160 e/N_γN

-2 10

-1 10

1

10

210 T=293K_2

Neon+1.0% & 0.1% & 0.01% H 3 Gain 10 full - APD dashed - PMT

0.01% H2

0.01% H2 0.1% H2

1.0% H2